
\chapter{Migration and Copy}
\label{MigrationChapter}
\index[general]{Migration}
\index[general]{Copy}

The term Migration, as used in the context of Bacula, means moving data from
one Volume to another.  In particular it refers to a Job (similar to a backup
job) that reads data that was previously backed up to a Volume and writes
it to another Volume.  As part of this process, the File catalog records
associated with the first backup job are purged.  In other words, Migration
moves Bacula Job data from one Volume to another by reading the Job data
from the Volume it is stored on, writing it to a different Volume in a
different Pool, and then purging the database records for the first Job.

The Copy process is essentially identical to the Migration feature with the
exception that the Job that is copied is left unchanged.  This essentially
creates two identical copies of the same backup. However, the copy is treated
as a copy rather than a backup job, and hence is not directly available for
restore. If bacula founds a copy when a job record is purged (deleted) from the
catalog, it will promote the copy as \textsl{real} backup and will make it
available for automatic restore.

The Copy and the Migration jobs run without using the File daemon by copying
the data from the old backup Volume to a different Volume in a different Pool.

The selection process for which Job or Jobs are migrated
can be based on quite a number of different criteria such as:
\begin{bsysitemize}
\item a single previous Job
\item a Volume
\item a Client
\item a regular expression matching a Job, Volume, or Client name
\item the time a Job has been on a Volume
\item high and low water marks (usage or occupation) of a Pool
\item Volume size
\end{bsysitemize}

The details of these selection criteria will be defined below.

To run a Migration job, you must first define a Job resource very similar
to a Backup Job but with {\bf Type = Migrate} instead of {\bf Type =
Backup}.  One of the key points to remember is that the Pool that is
specified for the migration job is the only pool from which jobs will
be migrated, with one exception noted below. In addition, the Pool to
which the selected Job or Jobs will be migrated is defined by the {\bf
Next Pool = ...} in the Pool resource specified for the Migration Job.

Bacula permits Pools to contain Volumes with different Media Types.
However, when doing migration, this is a very undesirable condition.  For
migration to work properly, you should use Pools containing only Volumes of
the same Media Type for all migration jobs.

The migration job normally is either manually started or starts
from a Schedule much like a backup job. It searches
for a previous backup Job or Jobs that match the parameters you have
specified in the migration Job resource, primarily a {\bf Selection Type}
(detailed a bit later).  Then for
each previous backup JobId found, the Migration Job will run a new Job which
copies the old Job data from the previous Volume to a new Volume in
the Migration Pool.  It is possible that no prior Jobs are found for
migration, in which case, the Migration job will simply terminate having
done nothing, but normally at a minimum, three jobs are involved during a
migration:

\begin{bsysitemize}
\item The currently running Migration control Job. This is only
      a control job for starting the migration child jobs.
\item The previous Backup Job (already run). The File records
      for this Job are purged if the Migration job successfully
      terminates.  The original data remains on the Volume until
      it is recycled and rewritten.
\item A new Migration Backup Job that moves the data from the
      previous Backup job to the new Volume.  If you subsequently
      do a restore, the data will be read from this Job.
\end{bsysitemize}

If the Migration control job finds a number of JobIds to migrate (e.g.
it is asked to migrate one or more Volumes), it will start one new
migration backup job for each JobId found on the specified Volumes.
Please note that Migration doesn't scale too well since Migrations are
done on a Job by Job basis. This if you select a very large volume or
a number of volumes for migration, you may have a large number of
Jobs that start. Because each job must read the same Volume, they will
run consecutively (not simultaneously).

\section{Migration and Copy Job Resource Directives}

The following directives can appear in a Director's Job resource, and they
are used to define a Migration job.

\begin{description}
\item [Pool = \lt{}Pool-name\gt{}] The Pool specified in the Migration
   control Job is not a new directive for the Job resource, but it is
   particularly important because it determines what Pool will be examined
   for finding JobIds to migrate.  The exception to this is when {\bf
   Selection Type = SQLQuery}, and although a Pool directive must still be
   specified, no Pool is used, unless you specifically include it in the
   SQL query.  Note, in any case, the Pool resource defined by the Pool
   directove must contain a {\bf Next Pool = ...} directive to define the
   Pool to which the data will be migrated.

\item [Type = Migrate]
   {\bf Migrate} is a new type that defines the job that is run as being a
   Migration Job.  A Migration Job is a sort of control job and does not have
   any Files associated with it, and in that sense they are more or less like
   an Admin job.  Migration jobs simply check to see if there is anything to
   Migrate then possibly start and control new Backup jobs to migrate the data
   from the specified Pool to another Pool.  Note, any original JobId that
   is migrated will be marked as having been migrated, and the original
   JobId can nolonger be used for restores; all restores will be done from
   the new migrated Job.


\item [Type = Copy]
   {\bf Copy} is a new type that defines the job that is run as being a
   Copy Job.  A Copy Job is a sort of control job and does not have
   any Files associated with it, and in that sense they are more or less like
   an Admin job.  Copy jobs simply check to see if there is anything to
   Copy then possibly start and control new Backup jobs to copy the data
   from the specified Pool to another Pool.  Note that when a copy is
   made, the original JobIds are left unchanged. The new copies can not
   be used for restoration unless you specifically choose them by JobId.
   If you subsequently delete a JobId that has a copy, the copy will be
   automatically upgraded to a Backup rather than a Copy, and it will
   subsequently be used for restoration.

\item [Selection Type = \lt{}Selection-type-keyword\gt{}]
  The \lt{}Selection-type-keyword\gt{} determines how the migration job
  will go about selecting what JobIds to migrate. In most cases, it is
  used in conjunction with a {\bf Selection Pattern} to give you fine
  control over exactly what JobIds are selected.  The possible values
  for \lt{}Selection-type-keyword\gt{} are:
  \begin{description}
  \item [SmallestVolume] This selection keyword selects the volume with the
        fewest bytes from the Pool to be migrated.  The Pool to be migrated
        is the Pool defined in the Migration Job resource.  The migration
        control job will then start and run one migration backup job for
        each of the Jobs found on this Volume.  The Selection Pattern, if
        specified, is not used.

  \item [OldestVolume] This selection keyword selects the volume with the
        oldest last write time in the Pool to be migrated.  The Pool to be
        migrated is the Pool defined in the Migration Job resource.  The
        migration control job will then start and run one migration backup
        job for each of the Jobs found on this Volume.  The Selection
        Pattern, if specified, is not used.

  \item [Client] The Client selection type, first selects all the Clients
        that have been backed up in the Pool specified by the Migration
        Job resource, then it applies the {\bf Selection Pattern} (defined
        below) as a regular expression to the list of Client names, giving
        a filtered Client name list.  All jobs that were backed up for those
        filtered (regexed) Clients will be migrated.
        The migration control job will then start and run one migration
        backup job for each of the JobIds found for those filtered Clients.

  \item [Volume] The Volume selection type, first selects all the Volumes
        that have been backed up in the Pool specified by the Migration
        Job resource, then it applies the {\bf Selection Pattern} (defined
        below) as a regular expression to the list of Volume names, giving
        a filtered Volume list.  All JobIds that were backed up for those
        filtered (regexed) Volumes will be migrated.
        The migration control job will then start and run one migration
        backup job for each of the JobIds found on those filtered Volumes.

  \item [Job] The Job selection type, first selects all the Jobs (as
        defined on the {\bf Name} directive in a Job resource)
        that have been backed up in the Pool specified by the Migration
        Job resource, then it applies the {\bf Selection Pattern} (defined
        below) as a regular expression to the list of Job names, giving
        a filtered Job name list.  All JobIds that were run for those
        filtered (regexed) Job names will be migrated.  Note, for a given
        Job named, they can be many jobs (JobIds) that ran.
        The migration control job will then start and run one migration
        backup job for each of the Jobs found.

  \item [SQLQuery] The SQLQuery selection type, used the {\bf Selection
        Pattern} as an SQL query to obtain the JobIds to be migrated.
        The Selection Pattern must be a valid SELECT SQL statement for your
        SQL engine, and it must return the JobId as the first field
        of the SELECT.

  \item [PoolOccupancy] This selection type will cause the Migration job
        to compute the total size of the specified pool for all Media Types
        combined. If it exceeds the {\bf Migration High Bytes} defined in
        the Pool, the Migration job will migrate all JobIds beginning with
        the oldest Volume in the pool (determined by Last Write time) until
        the Pool bytes drop below the {\bf Migration Low Bytes} defined in the
        Pool. This calculation should be consider rather approximative because
        it is made once by the Migration job before migration is begun, and
        thus does not take into account additional data written into the Pool
        during the migration.  In addition, the calculation of the total Pool
        byte size is based on the Volume bytes saved in the Volume (Media)
database
        entries. The bytes calculate for Migration is based on the value stored
        in the Job records of the Jobs to be migrated. These do not include the
        Storage daemon overhead as is in the total Pool size. As a consequence,
        normally, the migration will migrate more bytes than strictly necessary.

  \item [PoolTime] The PoolTime selection type will cause the Migration job to
        look at the time each JobId has been in the Pool since the job ended.
        All Jobs in the Pool longer than the time specified on {\bf Migration Time}
        directive in the Pool resource will be migrated.

  \item [PoolUncopiedJobs] This selection which copies all jobs from a pool
        to an other pool which were not copied before is available only for copy Jobs.

  \end{description}

\item [Selection Pattern = \lt{}Quoted-string\gt{}]
  The Selection Patterns permitted for each Selection-type-keyword are
  described above.

  For the OldestVolume and SmallestVolume, this
  Selection pattern is not used (ignored).

  For the Client, Volume, and Job
  keywords, this pattern must be a valid regular expression that will filter
  the appropriate item names found in the Pool.

  For the SQLQuery keyword, this pattern must be a valid SELECT SQL statement
  that returns JobIds.

\item [ Purge Migration Job = \lt{}yes/no\gt{}]
  This directive may be added to the Migration Job definition in the Director
  configuration file to purge the job migrated at the end of a migration.

\end{description}

\section{Migration Pool Resource Directives}

The following directives can appear in a Director's Pool resource, and they
are used to define a Migration job.

\begin{description}
\item [Migration Time = \lt{}time-specification\gt{}]
   If a PoolTime migration is done, the time specified here in seconds (time
   modifiers are permitted -- e.g. hours, ...) will be used. If the
   previous Backup Job or Jobs selected have been in the Pool longer than
   the specified PoolTime, then they will be migrated.

\item [Migration High Bytes =  \lt{}byte-specification\gt{}]
   This directive specifies the number of bytes in the Pool which will
   trigger a migration if a {\bf PoolOccupancy} migration selection
   type has been specified. The fact that the Pool
   usage goes above this level does not automatically trigger a migration
   job. However, if a migration job runs and has the PoolOccupancy selection
   type set, the Migration High Bytes will be applied.  Bacula does not
   currently restrict a pool to have only a single Media Type, so you
   must keep in mind that if you mix Media Types in a Pool, the results
   may not be what you want, as the Pool count of all bytes will be
   for all Media Types combined.

\item [Migration Low Bytes = \lt{}byte-specification\gt{}]
   This directive specifies the number of bytes in the Pool which will
   stop a migration if a {\bf PoolOccupancy} migration selection
   type has been specified and triggered by more than Migration High
   Bytes being in the pool. In other words, once a migration job
   is started with {\bf PoolOccupancy} migration selection and it
   determines that there are more than Migration High Bytes, the
   migration job will continue to run jobs until the number of
   bytes in the Pool drop to or below Migration Low Bytes.

\item [Next Pool = \lt{}pool-specification\gt{}]
   The Next Pool directive specifies the pool to which Jobs will be
   migrated. This directive is required to define the Pool into which
   the data will be migrated. Without this directive, the migration job
   will terminate in error.

\item [Storage = \lt{}storage-specification\gt{}]
   The Storage directive specifies what Storage resource will be used
   for all Jobs that use this Pool. It takes precedence over any other
   Storage specifications that may have been given such as in the
   Schedule Run directive, or in the Job resource.  We highly recommend
   that you define the Storage resource to be used in the Pool rather
   than elsewhere (job, schedule run, ...).
\end{description}

\section{Important Migration Considerations}
\index[general]{Important Migration Considerations}
\begin{bsysitemize}
\item Each Pool into which you migrate Jobs or Volumes {\bf must}
      contain Volumes of only one Media Type.

\item Migration takes place on a JobId by JobId basis. That is
      each JobId is migrated in its entirety and independently
      of other JobIds. Once the Job is migrated, it will be
      on the new medium in the new Pool, but for the most part,
      aside from having a new JobId, it will appear with all the
      same characteristics of the original job (start, end time, ...).
      The column RealEndTime in the catalog Job table will contain the
      time and date that the Migration terminated, and by comparing
      it with the EndTime column you can tell whether or not the
      job was migrated.  The original job is purged of its File
      records, and its Type field is changed from "B" to "M" to
      indicate that the job was migrated.

\item Jobs on Volumes will be Migration only if the Volume is
      marked, Full, Used, or Error.  Volumes that are still
      marked Append will not be considered for migration. This
      prevents Bacula from attempting to read the Volume at
      the same time it is writing it. It also reduces other deadlock
      situations, as well as avoids the problem that you migrate a
      Volume and later find new files appended to that Volume.

\item As noted above, for the Migration High Bytes, the calculation
      of the bytes to migrate is somewhat approximate.

\item If you keep Volumes of different Media Types in the same Pool,
      it is not clear how well migration will work.  We recommend only
      one Media Type per pool.

\item It is possible to get into a resource deadlock where Bacula does
      not find enough drives to simultaneously read and write all the
      Volumes needed to do Migrations. For the moment, you must take
      care as all the resource deadlock algorithms are not yet implemented.

\item Migration is done only when you run a Migration job. If you set a
      Migration High Bytes and that number of bytes is exceeded in the Pool
      no migration job will automatically start.  You must schedule the
      migration jobs, and they must run for any migration to take place.

\item If you migrate a number of Volumes, a very large number of Migration
      jobs may start.

\item Figuring out what jobs will actually be migrated can be a bit complicated
      due to the flexibility provided by the regex patterns and the number of
      different options.  Turning on a debug level of 100 or more will provide
      a limited amount of debug information about the migration selection
      process.

\item Bacula currently does only minimal Storage conflict resolution, so you
      must take care to ensure that you don't try to read and write to the
      same device or Bacula may block waiting to reserve a drive that it
      will never find. In general, ensure that all your migration
      pools contain only one Media Type, and that you always
      migrate to pools with different Media Types.

\item The {\bf Next Pool = ...} directive must be defined in the Pool
     referenced in the Migration Job to define the Pool into which the
     data will be migrated.

\item Pay particular attention to the fact that data is migrated on a Job
     by Job basis, and for any particular Volume, only one Job can read
     that Volume at a time (no simultaneous read), so migration jobs that
     all reference the same Volume will run sequentially.  This can be a
     potential bottle neck and does not scale very well to large numbers
     of jobs.

\item Only migration of Selection Types of Job and Volume have
     been carefully tested. All the other migration methods (time,
     occupancy, smallest, oldest, ...) need additional testing.

\item Migration is only implemented for a single Storage daemon.  You
     cannot read on one Storage daemon and write on another.
\end{bsysitemize}


\section{Example Migration Jobs}
\index[general]{Example Migration Jobs}

When you specify a Migration Job, you must specify all the standard
directives as for a Job.  However, certain such as the Level, Client, and
FileSet, though they must be defined, are ignored by the Migration job
because the values from the original job used instead.

As an example, suppose you have the following Job that
you run every night. To note: there is no Storage directive in the
Job resource; there is a Storage directive in each of the Pool
resources; the Pool to be migrated (File) contains a Next Pool
directive that defines the output Pool (where the data is written
by the migration job).

\footnotesize
\begin{lstlisting}
# Define the backup Job
Job {
  Name = "NightlySave"
  Type = Backup
  Level = Incremental                 # default
  Client=rufus-fd
  FileSet="Full Set"
  Schedule = "WeeklyCycle"
  Messages = Standard
  Pool = Default
}

# Default pool definition
Pool {
  Name = Default
  Pool Type = Backup
  AutoPrune = yes
  Recycle = yes
  Next Pool = Tape
  Storage = File
  LabelFormat = "File"
}

# Tape pool definition
Pool {
  Name = Tape
  Pool Type = Backup
  AutoPrune = yes
  Recycle = yes
  Storage = DLTDrive
}

# Definition of File storage device
Storage {
  Name = File
  Address = rufus
  Password = "ccV3lVTsQRsdIUGyab0N4sMDavui2hOBkmpBU0aQKOr9"
  Device = "File"          # same as Device in Storage daemon
  Media Type = File        # same as MediaType in Storage daemon
}

# Definition of DLT tape storage device
Storage {
  Name = DLTDrive
  Address = rufus
  Password = "ccV3lVTsQRsdIUGyab0N4sMDavui2hOBkmpBU0aQKOr9"
  Device = "HP DLT 80"      # same as Device in Storage daemon
  Media Type = DLT8000      # same as MediaType in Storage daemon
}

\end{lstlisting}
\normalsize

Where we have included only the essential information -- i.e. the
Director, FileSet, Catalog, Client, Schedule, and Messages resources are
omitted.

As you can see, by running the NightlySave Job, the data will be backed up
to File storage using the Default pool to specify the Storage as File.

Now, if we add the following Job resource to this conf file.

\footnotesize
\begin{lstlisting}
Job {
  Name = "migrate-volume"
  Type = Migrate
  Level = Full
  Client = rufus-fd
  FileSet = "Full Set"
  Messages = Standard
  Pool = Default
  Maximum Concurrent Jobs = 4
  Selection Type = Volume
  Selection Pattern = "File"
}
\end{lstlisting}
\normalsize

and then run the job named {\bf migrate-volume}, all volumes in the Pool
named Default (as specified in the migrate-volume Job that match the
regular expression pattern {\bf File} will be migrated to tape storage
DLTDrive because the {\bf Next Pool} in the Default Pool specifies that
Migrations should go to the pool named {\bf Tape}, which uses
Storage {\bf DLTDrive}.

If instead, we use a Job resource as follows:

\footnotesize
\begin{lstlisting}
Job {
  Name = "migrate"
  Type = Migrate
  Level = Full
  Client = rufus-fd
  FileSet="Full Set"
  Messages = Standard
  Pool = Default
  Maximum Concurrent Jobs = 4
  Selection Type = Job
  Selection Pattern = ".*Save"
}
\end{lstlisting}
\normalsize

All jobs ending with the name Save will be migrated from the File Default to
the Tape Pool, or from File storage to Tape storage.
