%\newfont{\bighead}{cmr17 at 36pt}
\parskip 10pt
\parindent 0pt

\title{\includegraphics[width=0.3\linewidth]{baculasystems-logo}
       \\        
        \Huge{Bacula\raisebox{0.1ex}{\textsuperscript\textregistered} Enterprise \bsystitle{}}}


\author{The Leading Open Source Backup Solution.\\Kern Sibbald}
\date{\begin{small}\today \\
            This manual documents Bacula version \input{version} \\
      \vspace{0.2in}
      Copyright {\copyright} 1999-\the\year, Free Software Foundation Europe
      e.V. \\
      Bacula\raisebox{0.1ex}{\textsuperscript\textregistered}  is a registered trademark of Kern Sibbald.\\
      \vspace{0.2in}
  Permission is granted to copy, distribute and/or modify this document under the terms of the
  GNU Free Documentation License, Version 1.2 published by the Free Software Foundation;
  with no Invariant Sections, no Front-Cover Texts, and no Back-Cover Texts.
  A copy of the license is included in the section entitled ``GNU Free Documentation License''.
  \end{small}
}
%%% --- Header and footer
\fancypagestyle{plain}{%
\fancyhf{}%
\renewcommand{\footrulewidth}{0.4pt}
\renewcommand{\headrulewidth}{0.4pt}
\fancyhead[LE,RO]{\small{\textit{Bacula Enterprise \bsystitle{}}}}%
\fancyhead[RE,LO]{\small{\textit{\textcolor{bsysredtwo}{\leftmark}}}}%Bacula Console and Opertors Guide}}}}%
\fancyfoot[RE,LO]{\small{\href{http://www.baculasystems.com}{www.baculasystems.com}
- \textit{Bacula Enterprise \bsystitle}}}% -- DRAFT}}}
\fancyfoot[LE,RO]{\small{\textit{\thepage/\pageref{LastPage}}}}
}

%%% --- Header and footer
\pagestyle{plain}
\renewcommand{\chaptermark}[1]{\markboth{#1}{}}
\renewcommand{\sectionmark}[1]{\markboth{#1}{}}
\maketitle
